0 500 1000 1500 2000 2500 3000 3500 4000

210

310

410

test stacked histograms

etot Ba137

Entries 26366 Mean 635.6 Std Dev 117.5

etot Cs137

Entries 27151 Mean 187.4 Std Dev 139

etot Xe137

Entries 27464 Mean 1866 Std Dev 860.6