:3.374e+05

50Mean RI :6.074e+05

80Mean RI :5.399e+05

90Mean RI :0.000e+00

50Min RI :0.000e+00

80Min RI :0.000e+00

90Min RI :4.032e+05

50Min RI :7.258e+05

90Max RI :6.452e+05

90Max RI :13.1 mm

50Men R :13.1 mm

90Mean R :8.5 mm

90Mean R :0.0 mm

50Min R :13.1 mm

80Min R :8.3 mm

90Min R :5.4 mm

50Max R :13.2 mm

80Max R :8.6 mm

90Max R

PSF of the MAGIC II mirrors