0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 hadronPlaneMomentum (MeV)

0 5000

10000

15000

20000

25000

30000

35000

40000

45000

50000

Events / ( 0.008 x 500 MeV )

0

0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

newh__xi_hadronPlaneMomentum

Entries 10000 Mean x 0.4657 Mean y 2005 RMS x 0.2469 RMS y 2168

Histogram of newh__xi_hadronPlaneMomentum