-0.6

-0.4

-0.2

0.20.40.60.8

0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

0.009U vs U Profile - DetElem ID 1

ΔResidual

U vs U Profile - DetElem ID 1

0.01

0.012U vs V Profile - DetElem ID 1

U vs V Profile - DetElem ID 1

-0.8

-0.6

-0.4

-0.2

0.20.40.60.8

0.012

0.014

0.016

0.018

0.02V vs U Profile - DetElem ID 1

V vs U Profile - DetElem ID 1

0.02V vs V Profile - DetElem ID 1

V vs V Profile - DetElem ID 1

-0.6

-0.4

-0.2

0.20.40.60.8

0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

0.022U vs U Profile - DetElem ID 2

ΔResidual

U vs U Profile - DetElem ID 2

0.022U vs V Profile - DetElem ID 2

U vs V Profile - DetElem ID 2

-0.8

-0.6

-0.4

-0.2

0.20.40.60.8

0.018V vs U Profile - DetElem ID 2

V vs U Profile - DetElem ID 2

0.018V vs V Profile - DetElem ID 2

V vs V Profile - DetElem ID 2

-0.6

-0.4

-0.2

0.20.40.60.8

-0.4

-0.3

-0.2

-0.1

0.10.20.30.4U vs U Profile - DetElem ID 4

ΔResidual

U vs U Profile - DetElem ID 4

-0.45

-0.35

-0.25

-0.15

-0.05

0U vs V Profile - DetElem ID 4

U vs V Profile - DetElem ID 4

-0.8

-0.6

-0.4

-0.2

0.20.40.60.8

0.10.20.30.4V vs U Profile - DetElem ID 4

V vs U Profile - DetElem ID 4

0.10.20.3V vs V Profile - DetElem ID 4

V vs V Profile - DetElem ID 4