/ ndf

2χ 49.55 / 33 p0 0.145± 2.042 p1 0.00673 ± -0.05528 p2 0.6± 3.998e+04 p3 0.0± -6357 p4 0.0± 379.1 p5 0.00± -10.05 p6 0.00000 ± 0.09989

e’E 10 12 14 16 18 20 22 24 26 28 30 data/mc

0.5 1 1.5 2 2.5 3 3.5 4

±

±