hmtfit

Entries 986

[GeV] tm 165 170 175

Number of Ensembles

0

20

40

60 hmtfit

Entries 986 Constant 2.39±

58.65 Mean 0.1±

169.9 Sigma 0.05±

1.96

mt hjesfit

Entries 986

jes 0.95 1 1.05

Number of Ensembles

0

20

40

60 hjesfit

Entries 986 Constant 2.2± 53.7 Mean 0.001±

0.995 Sigma 0.00046 ± 0.01714

jes hbjesfit

Entries 986

bjes

0.9 0.95 1 1.05

Number of Ensembles

0

20

40

60 hbjesfit

Entries 986 Constant 2.41±

57.76 Mean 0.001 ± 1.007 Sigma 0.0008 ± 0.0279

bjes

hmterr Entries 986 Mean 2.154 RMS 0.4204

[GeV] tmΔ 2 4 6

Number of Ensembles

0

50

100

150 mt error hjeserr

Entries 986 Mean 0.01835 RMS 0.001015

jes Δ 0.016 0.018 0.02 0.022

Number of Ensembles

0

20

40

60

jes error hbjeserr

Entries 986 Mean 0.03024 RMS 0.004534

bjes Δ 0.02 0.04 0.06

Number of Ensembles

0

50

100

bjes error

hmtpull

Entries 986 Constant 2.57±

63.81 Mean 0.03038 ± -0.06119 Sigma 0.022± 0.928

mt pull

-2 0 2 4

Number of Ensembles

0

20

40

60 ±

mt pull

hjespull

Entries 986 Constant 2.21±

53.18 Mean 0.0322 ± -0.2549 Sigma 0.0262 ± 0.9765

jes pull

-2 0 2

Number of Ensembles

0

20

40

60 ± ±

jes pull_{hbjespull}

Entries 986 Constant 2.19± 53.55 Mean 0.0318 ± 0.1698 Sigma 0.0245 ± 0.9561

bjes pull

-2 0 2

Number of Ensembles

0

20

40

60 hbjespull

± ±

bjes pull